Block Address CVD Diamond Information dd285@msstate.edu

Reply Forward Print Delete

Hi Dipangkar,

requested:

The size of the diamond is

would be:

parts.

Regards, Ginny

Ginny Cardona Applied Diamond, Inc. 3825 Lancaster Pike Wilmington, DE 19805 USA 1-800-222-5143; (302) 999-1132

ginny@ddk.com

Reply Forward Print Delete

Top